/*
  Warnings:

  - You are about to drop the column `workflowTemplateId` on the `Service` table. All the data in the column will be lost.

*/
-- DropForeignKey
ALTER TABLE "Service" DROP CONSTRAINT "Service_workflowTemplateId_fkey";

-- AlterTable
ALTER TABLE "Service" DROP COLUMN "workflowTemplateId",
ADD COLUMN     "workflowId" TEXT;

-- AddForeignKey
ALTER TABLE "Service" ADD CONSTRAINT "Service_workflowId_fkey" FOREIGN KEY ("workflowId") REFERENCES "WorkflowTemplate"("id") ON DELETE SET NULL ON UPDATE CASCADE;
