/*
  Warnings:

  - Added the required column `accountType` to the `BranchBank` table without a default value. This is not possible if the table is not empty.
  - Added the required column `bankBranch` to the `BranchBank` table without a default value. This is not possible if the table is not empty.
  - Added the required column `currentlyUse` to the `BranchBank` table without a default value. This is not possible if the table is not empty.
  - Made the column `branchId` on table `BranchBank` required. This step will fail if there are existing NULL values in that column.

*/
-- DropForeignKey
ALTER TABLE "BranchBank" DROP CONSTRAINT "BranchBank_branchId_fkey";

-- AlterTable
ALTER TABLE "BranchBank" ADD COLUMN     "accountType" TEXT NOT NULL,
ADD COLUMN     "bankBranch" TEXT NOT NULL,
ADD COLUMN     "currentlyUse" BOOLEAN NOT NULL,
ALTER COLUMN "branchId" SET NOT NULL;

-- AddForeignKey
ALTER TABLE "BranchBank" ADD CONSTRAINT "BranchBank_branchId_fkey" FOREIGN KEY ("branchId") REFERENCES "Branch"("id") ON DELETE CASCADE ON UPDATE CASCADE;
