/*
  Warnings:

  - You are about to drop the `WorkService` table. If the table is not empty, all the data it contains will be lost.
  - Added the required column `order` to the `Work` table without a default value. This is not possible if the table is not empty.

*/
-- DropForeignKey
ALTER TABLE "WorkService" DROP CONSTRAINT "WorkService_serviceId_fkey";

-- DropForeignKey
ALTER TABLE "WorkService" DROP CONSTRAINT "WorkService_workId_fkey";

-- AlterTable
ALTER TABLE "Work" ADD COLUMN     "order" INTEGER NOT NULL,
ADD COLUMN     "serviceId" TEXT;

-- DropTable
DROP TABLE "WorkService";

-- AddForeignKey
ALTER TABLE "Work" ADD CONSTRAINT "Work_serviceId_fkey" FOREIGN KEY ("serviceId") REFERENCES "Service"("id") ON DELETE CASCADE ON UPDATE CASCADE;
