/*
  Warnings:

  - Added the required column `registeredBranchId` to the `WorkflowTemplate` table without a default value. This is not possible if the table is not empty.

*/
-- AlterTable
ALTER TABLE "WorkflowTemplate" ADD COLUMN     "registeredBranchId" TEXT NOT NULL;

-- AddForeignKey
ALTER TABLE "WorkflowTemplate" ADD CONSTRAINT "WorkflowTemplate_registeredBranchId_fkey" FOREIGN KEY ("registeredBranchId") REFERENCES "Branch"("id") ON DELETE RESTRICT ON UPDATE CASCADE;
